Joint European and National Astronomical Meeting for 1997

JENAM - 97

2 – 5 July 1997

P A P E R C O N T R I B U T I O N^1

Submit this form to the Contact address of the Local Organising Committee, mentioned in x3.

Deadline: March 15, 1997 Direct questions to: elaset@astro.auth.gr

I wish to present an oral 2 poster 2 paper in a parallel session, in the general area of Astronomy:

Title (preliminary):

Special Instructions (optional):

Author List:

Name Address (Institution, Address, City, zip code, Country) 1. 2. 3. 4. 5. Contact Person:

(First Name, Initials, Family name)

Full address:

(City, Country, zip code)

E-mail:

Phone & FAX:

(+Country code) (area code) (phone and fax numbers)

The co-ordinating committees will referee and accept the contributed papers.

1If you wish to present more than one paper, please duplicate this form.